维多利亚老品牌vic



SORONA不抓毛双卫衣(三防)

 

描述:SORONA不抓毛双卫衣(三防)
内容详情/Details of the content

Code NO.DXH1335
(DXB14387AW)
布种:SORONA不抓毛双卫衣(三防)
Fabrication:French Terry (STORM Cotton ™)
成分Content:90%Cotton 10%SORONA
布封Width:70"实用CUttable+-1"
克重Weight:270G/M2+-5%

产品展示
首页
电话
留言反馈
sitemap网站地图